= Configuration

Boost process v2 can be configured in the following ways:

[cols="1,1"]
|===
| Macro | Description

| `BOOST_PROCESS_V2_STANDALONE` | Build boost.process for standalone asio
| `BOOST_PROCESS_USE_STD_FS`    | Use std::filesystem instead of boost::filesystem
| `BOOST_PROCESS_V2_POSIX_FORCE_DISABLE_CLOSE_RANGE` | Disable usage of `close_range`.
